-105 -100 -95 -90 -85 -80 -75 28

30

32

34

36

38

40

42

44 NO2 OMI corrected, 2006 m=06,19 h UTC

0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

1.8

2 x 10^{16}