0 2000

1000

600 1200 1800 400 200 1400 1600 800

NOx kg/day

latitude_dim pressure_dim

Mean 32.324 Max 1900.59 Min 0

-60 -30 0 30 60

0 100 200 300 400 500 600 700 800 900 1000