-30 -25 -20 -15 -10 -5 0 5 10 15 20 25 30 35

ECMWF T63L50 ZONAL MEAN U (m/s)

time pressure (mb)

Max 21.6896 Min -71.3998

Latitude 0 degrees

1979 1980 1981 1982 1983 1984 1985 1986 1987 1988

1000

100

10

1 1